PS˙VIEW COMMANDS LIST (1) (press ,

PgDn or œ

Esc )

PARAMETERS COMMAND ALIASES DESCRIPTION (FILE˙NAME) o a open new picture (FILE˙NAME) op ap open new paged document

c ŒF10 redraw current picture i ŒF11 initial parameter settings w ŒF12 view whole picture

{(FILE˙NAME)} wr˘

F2 write the restart information {(FILE˙NAME)} rr˘

F3 read the restart information {PAGE} pn np˘

F4 go to the specified page pf fp .

Home go to the first page pl lp Œ

End go to the last page {INCR} n ,

PgDn go to the next page {INCR} p +

PgUp go to the previous page {MAG} m set magnification factor g draw grid {HOR} {VER} v view magnified and shifted picture {HOR} {VER} vu #

Alt . magnify picture (≡ ‘v’) {HOR} {VER} vd #

Alt , diminish picture (≡ ‘v’ with scaling = 1MAG ) {HOR} {VER} go Œ

Tab shift screen (≡ ‘v’ with scaling = 1)

PS˙VIEW COMMANDS LIST (2) (press +

PgUp , ,

PgDn or œ

Esc )

PARAMETERS COMMAND ALIASES DESCRIPTION {SHIFT} s set shift {SHIFT} lˇ

← shift picture left {SHIFT} rˇ

→ shift picture right {SHIFT} u ff↑ shift picture up {SHIFT} d ff↓ shift picture down {STEP} ro G

Shift Tab rotate by STEP × 90 hf flip picture horizontaly vf flip picture verticaly {INCR} un œ

Del undo previous picture {INCR} re˚

Ins redo undone picture fr show frame (approximate printing area) {(FILE˙NAME)} pr f

Ctrl Print Scr print screen or send it to a file DEVICE˙NAME prs select printer (used by ‘pr’) r1024 set resolution (TVGA and TSENG) r800 set resolution (TVGA and TSENG) r640 set resolution (TVGA and TSENG)

rsc F̆9 reset screen

PS˙VIEW COMMANDS LIST (3) (press +

PgUp or œ

Esc )

PARAMETERS COMMAND ALIASES DESCRIPTION e attempt to recover from error

q 1Ctrl Q +Alt Q 1Alt F4 quit saving the restart x 0Ctrl X *Alt X œEsc exit without saving the restart hlp +Alt H F̆1 help

Remark 1: In curly braces appear optional parameters. Remark 2: Sequences in frames (keys) do not need pressing *

Enter , but they require ANSI.SYS to be installed.

Remark 3: Some commands are inactive or their meanings are changed as long as the help is on.