% This is a TeX code to test if french words are well hyphenated
%                           Copyright GUTenberg-Bernard Gaulle as in french.doc
%
%                                                           last mods: 11/23/95
\catcode`@=11
\gdef\iORI{\@@input}
\gdef\bye{\egroup% to avoid message \end inside level 1...
          \end{document}}
\ifx\documentclass\undefined%
\documentstyle{article}
\else%
\documentclass{article}
\usepackage{inputenc}%%%%%% to define \inputencoding
%\usepackage[T1]{fontenc}%%% here is the font encoding
\fi%
\nofiles
\begin{document}
\global\let\DOinput\iORI
\DOinput tstcoup.tex
\endinput
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%
%%      checksum        = "36218 25 69 835"
%%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
