Test REALCALC.TEX Version 1.0, Jan. 1993

Test: Radd 123461111.111111110=123461111.111111110 5556.444300000=5556.4443 3087.308700000=3087.3087 -3087.308700000=-3087.3087 -5556.444300000=-5556.4443

Test: Rsub 5556.444300000=5556.4443 3087.308700000=3087.3087 -3087.308700000=-3087.3087 -5556.444300000=-5556.4443

Test: Rmul 5332114=5332114 -5332114=-5332114 -5332114=-5332114 5332114=5332114 0=0 0=0 0=0 1234=1234 1234=1234 1=1 -1234=-1234 -1234=-1234 1=1 469122.237411728=469122.2374 46340.123456789=46340.123456789 4634012.345678900=4634012.3456789 0.250000000=0.25 0.062500000=0.0625 0.003906250=0.00390625 0.000015258=0.000015258 0.000000000=0 2.560000000=2.56 6.553600000=6.5536 42.949672960=42.94967296 1844.674407370=1844.674407 3402823.669205860=3402823.669

Test: Rdiv not ready Test: Rneg

- 0 = 0.000000000

- -1 = 1.000000000

- 1 = -1.000000000

- 0.5 = -0.500000000

- -0.5 = 0.500000000

- -1234.5678 = 1234.567800000 - 1234.5678 = -1234.567800000

Test: Rtrunc 0: 12345 0 1: 12345.1 0.0 2: 12345.12 0.00 3: 12345.123 0.000 4: 12345.1234 0.0000 5: 12345.12345 0.00000 6: 12345.123456 0.000000 7: 12345.1234567 0.0000000 8: 12345.12345678 0.00000000 9: 12345.123456789 0.000000000

Test: Rifle 0 < 0 ok 0 < 1 ok 1 < 0 ok 1 < 1 ok 1 < 2 ok 2 < 1 ok 0 < -1 ok -1 < 0 ok -1 < -1 ok -1 < -2 ok -2 < -1 ok 1 < 1.2 ok 1.2 < 1 ok -1 < -1.2 ok -1.2 < -1 ok 0.1 < 0.1 ok 0.1 < 0.2 ok 0.2 < 0.1 ok -0.1 < -0.2 ok -0.1 < -0.1 ok -0.2 < -0.1 ok

Test: Rifeq 0 = 0 ok 0 = 1 ok 1 = 0 ok 1 = 1 ok 1 = 2 ok 2 = 1 ok 0 = -1 ok -1 = 0 ok -1 = -1 ok -1 = -2 ok -2 = -1 ok 1 = 1.2 ok 1.2 = 1 ok -1 = -1.2 ok -1.2 = -1 ok 0.1 = 0.1 ok 0.1 = 0.2 ok 0.2 = 0.1 ok -0.1 = -0.2 ok -0.1 = -0.1 ok -0.2 = -0.1 ok

Test: Rifgt 0 > 0 ok 0 > 1 ok 1 > 0 ok 1 > 1 ok 1 > 2 ok 2 > 1 ok 0 > -1 ok -1 > 0 ok -1 > -1 ok -1 > -2 ok -2 > -1 ok 1 > 1.2 ok 1.2 > 1 ok -1 > -1.2 ok -1.2 > -1 ok 0.1 > 0.1 ok 0.1 > 0.2 ok 0.2 > 0.1 ok -0.1 > -0.2 ok -0.1 > -0.1 ok -0.2 > -0.1 ok Test: Rifneg 0: ok 0.5: ok .5: ok 1: ok -0: ok -0.5: ok -1: ok

Test: Rifzero 0: ok 0.5: ok .5: ok 1: ok -0: ok -0.5: ok -1: ok

Test: Rifpos 0: ok 0.5: ok .5: ok 1: ok -0: ok -0.5: ok -1: ok

Test: Rifint 0: ok -0: ok 1: ok -1: ok 0.5: ok -0.5: ok 1.5: ok -1.5: ok