Test of cmr10 on November 29, 1996 at 1307

´ 0  ´ 1  ´ 2  ´ 3  ´ 4  ´ 5  ´ 6  ´ 7
´ 00x  Γ  Δ  Θ  Λ  Ξ  Π  Σ  Υ

                                                                               ˝ 0x

´ 01x  Φ  Ψ  Ω  ff  fi  fl  ffi  ffl
´ 02x  ı  ȷ  `  ´  ˇ  ˘  ¯  ˚

                                                                               ˝ 1x

´ 03x  ¸  ß  æ  œ  ø  Æ  Œ  Ø
´ 04x  !  ”  #  $  %  &  ’

                                                                               ˝ 2x

´ 05x  (  )  *  +  ,  -  .  /
´ 06x  0  1  2  3  4  5  6  7

                                                                               ˝ 3x

´ 07x  8  9  :  ;  ¡  =  ¿  ?
´ 10x  @  A  B  C  D  E  F  G

                                                                               ˝ 4x

´ 11x  H  I  J  K  L  M  N  O
´ 12x  P  Q  R  S  T  U  V  W

                                                                               ˝ 5x

´ 13x  X  Y  Z  [  “  ]  ˆ  ˙
´ 14x  ‘  a  b  c  d  e  f  g

                                                                               ˝ 6x

´ 15x  h  i  j  k  l  m  n  o
´ 16x  p  q  r  s  t  u  v  w

                                                                               ˝ 7x

´ 17x  x  y  z  –  —  ˝  ˜  ¨

          ˝ 8       ˝ 9       ˝ A       ˝ B       ˝ C       ˝ D       ˝ E       ˝ F