Fig. 1. Patterns seen during Dictyostelium aggregation. The bright bands correspond to

moving cells. Left field of view 60 � 40 mm^2. Taken from (Newell, 1983). Right field of view

24 � 18 mm^2, density 2 � 10^6 cells per cm^2. Courtesy Kyoung Lee.

Fig. 2. The Receptor Box. R = Active and unphosphorylated cAMP receptor. D = Inactive

and phosphorylated cAMP receptor. RP and DP indicate receptor bound to cAMP. P = external cAMP.