Fig. 6. Formation of a spiral. The Z-axis indicates cAMP concentration. We initiate a plane

wave from the side. Later we reset one half of the plane back to the steady state values, breaking the wave. The end curves inwards and forms a spiral, as described in the text. Parameters as in Fig. 3.. The time between each frame is 20 min. dx = 0.1mm, dt = 0.01 min. 200 � 200 grid. The period for the spiral T ß60 min. To the right is a contour plot, where the cAMP concentration is represented in gray scale.